min k

st

0.986425786	s1	-	r1	-	1.013574214	s2	=	-62.0307119
0.99135867	s2	-	r2	-	1.00864133	s3	=	-407.2884343
0.99135867	s3	-	r3	-	1.00864133	s4	=	-342.9384343
0.991091062	s4	-	r4	-	1.008908938	s5	=	-136.6592986
0.99279977	s5	-	r5	-	1.00720023	s6	=	-99.2292504
0.992870039	s6	-	r6	-	1.007129961	s7	=	-40.4936624
0.994150691	s7	-	r7	-	1.005849309	s8	=	-15.3630711
0.994294157	s8	-	r8	-	1.005705843	s9	=	-10.6637456
0.993784707	s9	-	r9	-	1.006215293	s10	=	-6.8417586
0.991433623	s10	-	r10	-	1.008566377	s11	=	-3.2758071
0.987060549	s11	-	r11	-	1.012939451	s12	=	-1.3019003
0.985550937	s12	-	r12	-	1.014449063	s13	=	-9.0577825


s1	-	k	<=	0
s2	-	k	<=	0
s3	-	k	<=	0
s4	-	k	<=	0
s5	-	k	<=	0
s6	-	k	<=	0
s7	-	k	<=	0
s8	-	k	<=	0
s9	-	k	<=	0
s10	-	k	<=	0
s11	-	k	<=	0
s12	-	k	<=	0


r1	>=	51.68
r2	>=	127.85
r3	>=	127.85
r4	>=	65.27
r5	>=	27.18
r6	>=	203.99
r7	>=	203.99
r8	>=	179.47
r9	>=	89.76
r10	>=	0
r11	>=	0
r12	>=	0

s13	-	s1	=	0

end
